-30 -25 -20 -15 -10 -5 0 5 10

-500

-450

-400

-350

-300

-250

-200

-150

-100 -50 [S west] ORCA025.L50_LIM-T323 (2000-2007)

33.5

34

34.5

35

35.5

36

36.5